% \subsubsection{The End}
% It seems that some of the files need to conclude with something or another.
%    \begin{macrocode}
%<*htXimera>
\Hinput{ximera}
%</htXimera>
%    \end{macrocode}

%    \begin{macrocode}
%<*htXourse>
\Hinput{xourse}
%</htXourse>
%    \end{macrocode}

%    \begin{macrocode}
%<*cfgXimera>
\begin{document} 
\EndPreamble
%</cfgXimera>
%    \end{macrocode}
