%<*cmp>
\CompatSection{\spec{land}}
\CompatTable{land}{main}{{
  above corps support/{main={above corps support}},
  administrative/{main={squashed text=ADM}},
  air and naval gunfire liaison company/{main={[fill]artillery,reconnaissance,air traffic},upper={naval}},
  air assault with organic lift/{main={air assault with organic lift}},
  air defence/{main={air defence}},
  air traffic services/{main={air traffic,[fill]individual}},
  ammunition/{main={ammunition}},
  amphibious/{main={amphibious}},
  analysis electronic warfare/{main={analysis,electronic warfare wide}},
  analysis/{main={analysis}},
  anti tank anti armour/{main={anti tank anti armour}},
  armoured engineer/{main={armoured,[scale=.7]engineer}},
  armoured/{main={armoured}},
  aviation composite fixed wing and rotary wing/{main={[fill]fixed and rotary wing}},
  aviation fixed wing/{main={fixed wing}},
  aviation rotary wing/{main={rotary wing}},
  band/{main={squashed text=BAND}},
  broadcast transmitter antenna/{main={antenna}},
  chemical biological radiological nuclear defence/{main={chemical biological radiological nuclear}},
  civil affairs/{main={text=CA}},
  civilian military cooperation/{main={civilian military cooperation}},
  civilian police/{main={civilian police}},
  combat service support/{main={squashed text=CSS}},
  combat support/{main={combat support}},
  combat/{main={squashed text=CBT}},
  combined arms/{main={combined arms}},
  corps support/{main={corps support}},
  counter intelligence/{main={text=CI}},
  criminal investigation division/{main={squashed text=CID}},
  direction finding electronic warfare/{main={direction finding,electronic warfare wide}},
  diving/{main={diving}},
  dog/{main={squashed text=DOG}},
  drilling/{main={drilling}},
  electronic ordinance disposal/{main={squashed text=EOD}},
  electronic ranging/{main={electronic ranging}},
  electronic warfare/{main={text=EW}},
  engineer/{main={engineer}},
  environmental protection/{main={environmental protection}},
  field artillery observer/{main={{[clip]observer},{[scale=.7,shift={(0,-.1)},fill]artillery},reconnaissance}},
  field artillery/{main={[fill]artillery}},
  finance/{main={finance}},
  fire protection/{main={fire protection}},
  geospatial support/{main={squashed text=GEO}},
  government organization/{main={text=GO}},
  headquarters/{main={headquarters}},
  individual/{main={individual}},
  infantry/{main={infantry}},
  information operations/{main={text=IO}},
  intercept electronic warfare/{main={[fill]analysis,electronic warfare wide}},
  intercept/{main={[fill]analysis}},
  internal security force/{main={squashed text=ISF}},
  interrogation/{main={squashed text=IPW}},
  jamming electronic warfare/{main={jamming,text=EW}},
  jamming/{main={jamming}},
  joint fire support/{main={squashed text=JFS}},
  judge advocate general/{main={squashed text=JAG}},
  killing victim/{main={killing,individual}},
  killing victims/{main={killing,group}},
  labour/{main={labour}},
  laundry/{main={laundry}},
  liaison/{main={text=LO}},
  main gun system/{main={main gun}},
  maintenance/{main={maintenance=fill}},
  material/{main={squashed text=MAT}},
  medical treatment facility/{main={medical treatment}},
  medical/{main={medical}},
  meteorological/{main={squashed text=MET}},
  military intelligence/{main={text=MI}},
  military police/{main={text=MP}},
  mine/{main={mine}},
  missile/{main={land missile}},
  morale welfare and recreation/{main={squashed text=MWE}},
  mortar/{main={mortar}},
  mortuary affairs/{main={mortuary affairs}},
  motorized/{main={motorized}},
  naval/{main={naval}},
  observer/{main={observer}},
  ordnance/{main={ordnance}},
  organisation or group/{main={organisation}},
  personnel services/{main={text=PS}},
  petroleum oil and lubricants/{main={fuel}},
  pipeline/{main={pipeline}},
  postal/{main={postal}},
  psychological operations broadcast/{main={antenna,{[scale=.7,fill]psychological}}},
  psychological/{main={psychological}},
  public affairs/{main={text=PA}},
  quartermaster/{main={quartermaster}},
  radar/{main={radar}},
  radio relay:/{main={radio relay}},
  radio teletype centre/{main={radio teletype}},
  radio/{main={radio}},
  reconnaissance/{main={reconnaissance}},
  religious support/{main={squashed text=REL}},
  replacement holding unit/{main={squashed text=RHU}},
  sea air land/{main={squashed text=SEAL}},
  search electronic warfare/{main={search,electronic warfare wide}},
  search/{main={search}},
  security/{main={squashed text=SEC}},
  self propelled field artillery/{main={motorized,artillery}},
  sensor/{main={sensor}},
  shore patrol security police/{main={text=SP}},
  signal radio relay/{main={signal,radio relay}},
  signal radio teletype centre/{main={signal,radio teletype}},
  signal radio/{main={signal,radio}},
  signal tactical satellite/{main={signal,tactical satellite}},
  signal/{main={signal}},
  sniper:/{main={sniper}},
  special forces/{main={text=SF}},
  special operations forces/{main={squashed text=SOF}},
  spy:/{main={squashed text=SPY}},
  supply/{main={supply}},
  surveillance/{main={[fill]observer}},
  survey/{main={survey}},
  sustainment/{main={squashed text=SUST}},
  tactical mortar/{main={armoured,[scale=.6]mortar}},
  tactical satellite/{main={tactical satellite}},
  topographic/{main={topographic}},
  transportation/{main={transportation}},
  unmanned systems/{main={unmanned}},
  victim of an attempted crime/{main={individual,crime}},
  video imagery/{main={video imagery}},
  water purification/{main={water,{[shift={(-.2,.-.1)}]small squashed text=PURE}}},
  water/{main={water}},
}}

\CompatTable{land}{upper}{{
  Mil medical role 1/{upper={text=1}},
  Mil medical role 2/{upper={text=2}},
  Mil medical role 3/{upper={text=3}},
  Mil medical role 4/{upper={text=4}},
  air assault/{upper={air assault}},
  area/{upper={squashed text=AREA}},
  assassination/{upper={text=AS}},
  attack/{upper={text=A}},
  biological/{upper={text=B}},
  border/{upper={squashed text=BOR}},
  bridging/{upper={bridge}},
  chemical/{upper={text=C}},
  close protection/{upper={squashed text=CLP}},
  coerced or impressed recruit/{upper={text=C}},
  combat/{upper={squashed text=CBT}},
  command and control/{upper={text=C2}},
  communications contingency package/{upper={squashed text=CCP}},
  construction/{upper={squashed text=CONST}},
  cross cultural communication/{upper={squashed text=CCC}},
  crowd and riot control/{upper={squashed text=CRC}},
  decontamination/{upper={text=D}},
  detention/{upper={squashed text=DET}},
  direct communications/{upper={direct communications}},
  displaced persons refugees and evacuees/{upper={squashed text=DPRE}},
  diving/{upper={diving}},
  division/{upper={text=XX}},
  dog/{upper={squashed text=DOG}},
  drilling/{upper={drilling}},
  electro optical/{upper={text=EO}},
  enhanced/{upper={squashed text=ENH}},
  execution/{upper={text=EX}},
  explosive ordnance disposal/{upper={squashed text=EOD}},
  fire direction centre/{upper={squashed text=FDC}},
  force/{upper={text=F}},
  foreign fighters/{upper={text=FF}},
  forward/{upper={squashed text=FWD}},
  gang member or gang/{upper={squashed text=GANG}},
  government organisation/{upper={text=GO}},
  ground station module/{upper={squashed text=GSM}},
  hijacking/{upper={text=H}},
  kidnapping/{upper={text=K}},
  landing support/{upper={text=LS}},
  large extension node/{upper={squashed text=LEN}},
  leader or leadership/{upper={squashed text=LDR}},
  maintenance:/{upper={maintenance}},
  mine countermeasuure/{upper={squashed text=MCM}},
  missile:/{upper={land missile}},
  mobile advisor and support/{upper={mobile advisor and support}},
  mobile subscriber equipment/{upper={squashed text=MSE}},
  mobility support/{upper={text=MS}},
  movement control centre/{upper={squashed text=MCC}},
  multinational specialized unit/{upper={squashed text=MSU}},
  multinational/{upper={text=MN}},
  multiple rocket launcher/{upper={rocket launcher=multiple head}},
  murder victims/{upper={text=MU}},
  naval/{upper={naval}},
  node centre/{upper={text=NC}},
  non-governmental organization member or non-governmental/{upper={organisation}},
  nuclear:/{upper={text=N}},
  operations:/{upper={squashed text=OPS}},
  piracy:/{upper={text=PI}},
  radar:/{upper={radar}},
  radiological/{upper={squashed text=RAD}},
  rape/{upper={text=RA}},
  religious or religious organisation/{upper={squashed text=REL}},
  runway/{upper={runway}},
  search and rescue/{upper={squashed text=SAR}},
  security/{upper={squashed text=SEC}},
  sensor control module/{upper={squashed text=SEM}},
  sensor/{upper={sensor}},
  signals intelligence/{upper={signals intelligence}},
  single rocket launcher/{upper={rocket launcher=single head}},
  single shelter switch/{upper={squashed text=SSS}},
  smoke/{upper={text=S}},
  sniper/{upper={sniper}},
  sound ranging/{upper={squashed text=SDR}},
  special weapons and tactics/{upper={squashed text=SWAT}},
  survey:/{upper={survey}},
  tactical exploitation/{upper={text=TE}},
  target acquisition/{upper={text=TA}},
  targeted individual or organisation/{upper={squashed text=TGT}},
  terrorist or terrorist organisation/{upper={squashed text=TER}},
  topographic/{upper={topographic}},
  utility/{upper={text=U}},
  video imagery/{upper={video imagery}},
  willing recruit/{upper={text=W}},
}}

\CompatTable{land}{lower}{{
  airborne/{lower={airborne}},
  arctic/{lower={arctic}},
  battle damage repair/{lower={squashed text=BDR}},
  bicycle equipped/{lower={bicycle equipped}},
  clearing/{lower={squashed text=CLR}},
  close range/{lower={text=CR}},
  control/{lower={control}},
  decontamination/{lower={text=D}},
  demolition/{lower={squashed text=DEM}},
  dental/{lower={text=D}},
  digital/{lower={squashed text=DIG}},
  enhanced location reporting system/{lower={enhanced location reporting system}},
  equipment/{lower={text=E}},
  heavy/{lower={text=H}},
  intensive care/{lower={text=IC}},
  intermodal/{lower={intermodal}},
  laboratory/{lower={squashed text=LAB}},
  launcher/{lower={launcher}},
  light/{lower={text=L}},
  long range/{lower={text=LR}},
  medium range/{lower={text=MR}},
  mountain/{lower={mountain}},
  multi channel/{lower={text=MC}},
  optical/{lower={squashed text=OPT}},
  pack animal/{lower={pack animal}},
  patient evacuation coordination/{lower={squashed text=PEC}},
  preventative maintenance/{lower={text=PM}},
  psychological/{lower={text=P}},
  radio relay line of sight/{lower={radio relay line of sight}},
  railroad/{lower={railroad}},
  recovery maintenance/{lower={maintenance}},
  recovery unmanned systems/{lower={recovery unmanned systems}},
  rescue coordination centre/{lower={squashed text=RCC}},
  riverine/{lower={riverine}},
  short range/{lower={text=SR}},
  single channel/{lower={text=SC}},
  ski/{lower={ski}},
  strategic/{lower={squashed text=STR}},
  support/{lower={squashed text=SPT}},
  tactical/{lower={squashed text=TAC}},
  towed/{lower={towed}},
  troop/{lower={text=T}},
  vertical of short takeoff and landing/{lower={squashed text=VSTOL}},
  veterinary/{lower={text=V}},
  wheeled/{lower={wheeled}},
}}
%</cmp>
%
