%<*cmp>
\CompatSection{\spec{installation}}
\CompatTable{installation}{main}{{
  airport/{main={base},upper={air strip}},
  ammunition cache/{main={ammunition,supply}},
  black list location/{main={squashed text=BLK}},
  broadcast transmitter antenna/{main={antenna}},
  chemical biological radiological nuclear/{main={chemical biological radiological nuclear}},
  civilian telecommunications/{main={civilian telecommunications}},
  electric power/{main={electric power}},
  food distribution/{main={food,supply}},
  grey list location/{main={squashed text=GRAY}},
  mass grave site/{main={{[scale=.7,yshift=-.05]mortuary affairs},{[scale=.7,shift={(-.22,.05)}]mortuary affairs},{[scale=.7,shift={(.22,.05)}]mortuary affairs}}},
  medical treatment facility/{main={medical treatment}},
  medical/{main={medical}},
  mine/{main={quarry}},
  naval/{main={naval}},
  nuclear/{main={nuclear}},
  printed media/{main={printed media}},
  safe house/{main={squashed text=SAFE}},
  transportation/{main={transportation}},
  water treatment/{main={water,{[shift={(-.2,.-.1)}]small squashed text=PURE}}},
  water/{main={water}},
  white list location/{main={squashed text=WHT}},
}}

\CompatTable{installation}{upper}{{
  biological/{upper={text=B}},
  chemical/{upper={text=C}},
  coal/{upper={text=CO}},
  geothermal/{upper={text=GT}},
  hydroelectric/{upper={text=HY}},
  natural gas/{upper={text=NG}},
  nuclear energy/{upper={nuclear}},
  nuclear/{upper={text=N}},
  petroleum/{upper={fuel}},
  radio/{upper={text=R}},
  railroad/{upper={railroad}},
  telephone/{upper={text=T}},
  television/{upper={text=TV}},
  yard/{upper={squashed text=YRD}},
}}
%</cmp>
